1 Star2 Stars3 Stars4 Stars5 Stars (No Ratings Yet)
Loading ... Loading … Ho visto il profilo di un tipo che come foto aveva un cartello con su scritto:
CERCASI DONNA
CON LIBRETTO D’ISTRUZIONI
E MANUALE D’USO
Smiley Smiley Smiley
Il libretto d’istruzioni con apostrofo o senza?
SmileySmileySmiley

Io,

Il libretto DISTRUZIONI….
Smiley
ce l’avrei……

SmileySmileySmileySmileySmiley

“ LIBRETTO DISTRUZIONE”
E
“MODALITA’ D’USO”
DELLA DONNA
A  Z

DATI ABITAZIONE
Immobile sito in …Cesena…………………………………- …..……
via ………L.go ABC. .………………………………………….- ………. …
DATI PROPRIETA’
Sig./Sig.ra …….Insolita_mente.………………………- ………..……
residente in ……Cesena.……. ………………………………………..
via ………………L.go ABC. ……..………………………………..…- ….
tel. ………………………..….. cell 349/000.000.0.……………………
reperibilità .……al cell..…sì………………………………- … ….……

ISTRUZIONI IMPIANTI FISICI DOMESTICI

• CENTRO ELABORAZIONI DATI (CED)

Il Centro Elaborazione è stato progettato all’interno della casa Madre ed è entrato pienamente in funzione quando il prodotto Donna Insolita_mente ha fatto il suo ingresso in Società. Oltre che ad essere un centro di raccolta dati, coscienti ed incoscienti, esso è in grado di elaborare dalle più piccole alle più grandi informazioni esterne per realizzare successivamente un programma di sopravvivenza che si può definire dignitoso ed onorevole. Dotato di sensori particolarmente sensibili simili a micro fibre ottiche, è in grado di percepire aspetti della realtà quotidiana che a volte sfuggono ai sensi comuni. Per conseguenza le soluzioni ed i risultati di ogni singola elaborazione si incastra perfettamente in un insieme più grande e molto ben equilibrato, sia a livello personale che a livello sociale. Insieme a quello vitale ed a quello fantastico, è l’impianto che offre le maggiori garanzie. Non necessita di revisioni e gli aggiornamenti avvengono autonomamente ed automaticamente. Potrebbe essere sensibile a virus quali Alzheimer etc. ma al momento non vi sono rischi di alcun genere, poiché dotato di un ottimo antivirus (di cui omettiamo il nome per sicurezza) in continuo aggiornamento.

• IMPIANTO VITALE ED ANNESSI

L’impianto è in ottima condizione, anche se il combustibile spesso è di natura sentimentale, di difficile reperimento e governabilità, pertanto impossibile quantificare una resa al mc. L’esaurimento dell’infiammabile non influisce però sul riscaldamento poiché possiede un’autonomia assai elevata. Paradossalmente però l’utilizzo di un combustibile aumenta la resa ed influisce benevolmente su tutti gli impianti della struttura corporea, mentale, psicologica, sentimentale ed emotiva e ne ottimizza le relative caratteristiche e qualità. Non necessita di controlli fumi e revisioni periodiche poiché è di alta affidabilità. Si consiglia di controllare periodicamente il livello del carburante che non deve scendere sotto i livelli minimi indicati di volta in volta dal contatore.

• IMPIANTO FANTASTICO ED ANNESSI

L’impianto è in ottima condizione, il suo design unisce nelle proprie creazioni, funzionalità e bellezza. La sua creatività rende concrete le idee, trasformandosi in oggetti che a volte arricchiscono gli ambienti, a volte appagano gli occhi per puro diletto

• IMPIANTO EMOTIVO
SENTIMENTALE ED ANNESSI

L’impianto funziona perfettamente, anche in condizioni di isolamento. Nonostante questo, però, è direttamente e proporzionalmente legato al sistema vitale. Qualora esista il combustibile esterno, le emozioni ed i sentimenti subiscono gli influssi delle condizioni metereologiche del sistema vitale stesso, diventando strumenti e informazioni che il CED elaborerà nel suo piano di sopravvivenza ( PDS). Questa potrebbe (è ) una di quelle situazioni in cui tutto è possibile che avvenga o accada perchè il PDS, in caso di difficoltà, mette Donna Insolita_mente al di sopra di tutto e di tutti. Normalmente però il funzionamento è armonico.

• IMPIANTO DI COMUNICAZIONE ED ANNESSI

L’impianto è in ottima condizione. Tutte le trasmissioni risultano essere una perfetta sintesi ed analisi di dati in entrata attraverso GLI altri impianti primari, che attraverso una sofisticata elaborazione di un settore speciale del CED , vengono rimessi in circolazione opportunamente modificati. Tali informazioni possono essere verbali, scritte, gestuali e comportamentali.

• IMPIANTO VISIVO ED ANNESSI

L’impianto è in ottima condizione,

• IMPIANTO UDITIVO ED ANNESSI

Qualche problema di ricezione

• IMPIANTO OLFATTIVO ED ANNESSI

L’impianto è in ottima condizione

• IMPIANTO TATTILE ED ANNESSI

L’impianto è in ottima condizione

• IMPIANTO GUSTATIVO ED ANNESSI

L’impianto è in ottima condizione

• IMPIANTO DIGESTIVO ED ANNESSI

L’impianto è in ottima condizione

• IMPIANTO MOTORIO ED ANNESSI

L’impianto ha qualche problema alle articolazioni delle spalle

• IMPIANTO RESPIRATORIO ED ANNESSI

L’impianto è in ottima condizione

• IMPIANTO IDRICO ED ANNESSI

L’impianto è in ottima condizione

• IMPIANTO RIPRODUTTIVO ED ANNESSI

Le informazioni di questo impianto sono strettamente riservate SmileySmiley

• IMPIANTO SESSUALE ED ANNESSI

Le informazioni di questo impianto sono strettamente riservate SmileySmiley

Istruzioni per l’uso:

Amica e compagna fidata, fedele e punto di riferimento certo e sicuro.
La persona in questione è dotata di un forte intuito, un grande sesto senso, una grande capacità percettiva ed una grande sensibilità alle bugie. Tali caratteristiche non sempre possono essere apprezzate in quanto di solito tendono far emergere lati da tenere nascosti.
Il suo grande spirito d’adattamento può tornare utile perché la si può variamente collocare anche se è opportuno informarla della sua eventuale sistemazione.
Nel suo insieme, Donna Insolita_mente è ben equilibrata nelle sue funzionalità. Potrebbe però accadere che, nelle relazioni sociali , ci possano essere dei blocchi di natura caratteriale reciproca. In questo caso la verbalizzazione dei propri stati d’animo, delle proprie emozioni, unite allo scambio di tutte le varie informazioni personali degli interlocutori, è quasi certo, possa appianare e livellare qualsiasi contrasto sorto. La sua elasticità mentale non la chiude in schemi o concetti predeterminati, di conseguenza, nel continuo mutare della vita, tutte le possibili e probabili soluzioni, possono essere da lei contemplate ed accettate. Alcune precauzioni da adottare, per evitare ristagni ed irrigidimenti nelle varie funzionalità, sono: 1) prestare molta attenzione ai contenuti dell’impianto vocale in uscita intendendo esattamente ciò che viene detto; 2) lubrificarlo molto spesso in entrata con discorsi di medio alto contenuto di sentimenti, emozioni, obiettivi da parte dell’interlocutore; 3) non dare mai nulla per scontato, 4) dare il maggior numero di informazioni possibili affinché il CED possa “liberamente” adottare e scegliere i percorsi da seguire ed assumersi le responsabilità dei singoli casi.

Avvertenze

Poiché è dotata di un forte spirito di indipendenza, è opportuno, prima di qualsiasi utilizzo, rendere chiari gli obiettivi preposti per evitare di trovarsi in situazioni insostenibili di intolleranza da entrambe le parti, e per evitare di rimanere soli per il suo abbandono del campo da gioco.
Come compagna essa è fedele, totalitaria ed esclusivista e pretenziosa di altrettante caratteristiche.

Controindicazioni:

Non indicata per: ambienti ove l’apparire e l’avere sono le regole della casa; ove le parole vengono spese tanto per riempire il silenzio, il tempo e la bocca; ove esiste la volgarità, la pornografia, la violenza e la menzogna, ove, per quieto vivere, non ci si assume la responsabilità delle proprie azioni.
Se ne sconsiglia qualsiasi utilizzo in caso di scopi diversi da quelli opportunamente dichiarati ed accettati dalla stessa.

Garanzia

La garanzia ha validità illimitata, semprechè vengano rispettate le modalità d’uso e non vengano manomessi, in alcun modo, gli impianti originari.

Per ogni eventuale contestazione rivolgersi direttamente, entro e non oltre 7 giorni dalla data dell’evento, a Donna Insolita_mente poiché, essendo perfettamente in grado di intendere e di volere, sa da sola ciò che deve o non deve fare, dire, pensare, andare, etc..etc..