1 Star2 Stars3 Stars4 Stars5 Stars (No Ratings Yet)
Loading ... Loading …

Autunno

Il celeste è diventato grigiastro

aspre gocce vetrificate

hanno schiantato i muti tigli

<?xml:namespace prefix = o ns = "urn:schemas-microsoft-com:office:office" /> 

del nostro sorridente viale

dove nacque e si perse

il nostro tenero e breve amore

Le foglie che cadono al suolo

non hanno più voglia di vivere

si uniscono in cumuli per farsi coraggio

prima d’addormentarsi per sempre

Per non infastidire chi vive

s’abbandonano al fato

ricordando l’ubriacatura solare

che un giorno le aveva fatte gioire