1 Star2 Stars3 Stars4 Stars5 Stars (No Ratings Yet)
Loading ... Loading …

 Il mio cane ti annusò,

avrei voluto farlo io,

chissa se avrei capito,

non eri fatta per me,

non ero io per te,

il mio cane ti annusò

e non mi disse niente,

in seguito, a lungo,

indugiai da quelle parti

il mio naso non da poco,

finalmente ho capito,

non ci si può fidare

del senso dell’olfatto,

così provai col tatto

e vi introdussi il dito,

mi ci trovavo bene,

scopersi cosa fosse

un utero didelfico

e, conoscenza biblica,

con te stessa, a volte,

scopersi ti ho tradita,

didelfica tu avevi

non soltanto l’utero,

pure anche la fica.

Bernardo d’Aleppo

Milano 10-5-2003