1 Star2 Stars3 Stars4 Stars5 Stars (1 voti, media: 2,00 su 5)
Loading ... Loading …

La Canzone dell’Ozena

L’uomo con le croste puzzava a non finire
puzzava di aragoste prossime a marcire
Non fece il militare per colpa del fetore
ma questo non fu un dramma,al diavolo l’onore

La moglie lo piantò,il figlio se ne andò
persino in officina gli dissero: “Vo! Vo!”

E quando fu sul punto di togliersi la vita
andarono per dirgli che l’ozena era finita
La moglie lo baciò, il figlio ritornò
e intanto quel fetore giammai si dileguò

Ma se non era lui, che era sta latrina?
Puzzavano il figliolo e la sua mogliettina.

Copyright ©2008 Luca Zammataro