1 Star2 Stars3 Stars4 Stars5 Stars (No Ratings Yet)
Loading ... Loading … - Ba: un po’ difficile, definire questa entità. Di sicuro era qualcosa di speciale, che solo la creatura umana possedeva e che la differenziava all’animale (senza anima).
Alla sottoscritta piace definirla la parte divina che è in ogni essere umano: l’Anima, che Dio trasfuse all’uomo quando lo creo, soffiandogli attraverso le narici. (concetto ripreso successivamente dalla cultura ebraica: basta leggere la Bibbia e la Creazione dell’uomo)
Il Ba è raffigurato come un uccello (quasi sempre un airone) con testa umana, forse a causa della presenza dei numerosi stormi d’uccelli che stazionavano sulle cime dei monti delle necropoli.
- Ib: il cuore, sede della coscienza e del carattere di ogni individuo.

- Shut: l’Ombra. Copia in negativo del djet, alla morte dell’individuo, l’Ombra si staccava dal corpo e vagava inquieta nell’attesa del Giudizio di Osiride. Accadeva anche che lo seguisse nell’Aldilà.

- Ren: il Nome. Era così importante, questa entità, da negare l’esistenza a chi non lo possedeva o non lo possedeva più. Basti pensare al deplorevole uso di cancellare da Templi e Monumenti, il nome di alcuni Faraoni scomodi, come il celeberrimo Akhenaton, al solo scopo di cancellarne la memoria.
- Akh: chiamato anche il Glorioso o il Luminoso.

Cosa accadeva ad una persona appena defunta?
Ecco il rituale cui era sottoposta e il mito, a cui il popolo egizio si aggrappava.
Convinto?… Immagino di sì!… Almeno quella parte del popolo tenuto nell’ignoranza!
Subito dopo il decesso, i Sacerdoti funerari prelevavano il cadavere e lo trasportavano alla Casa dell’Imbalsamazione per prepararlo “fisicamente” all’Immortalità.
Settanta o anche ottanta giorni, durava il processo di conservazione del corpo, ma qui, bisogna fare una distinzione fra Imbalsamazione e Mummificazione.
La seconda era un “processo naturale” di conservazione del corpo e lo si praticò, all’incirca, fino alla IV o V Dinastia (epoca di Giza, Sakkara, ecc). Non occorreva intervenire sul corpo, poiché bastavano clima secco e temperature elevate.
La prima era, invece, un “processo artificiale”. Il corpo veniva svuotato degli organi molli (fegato, stomaco, intestino e polmone, i quali venivano conservati in appositi contenitori, conosciuti con il nome di vasi canopi) e il vuoto era riempito con paglia, resine, balsami; poiché non si praticava ancora la sutura delle ferite, queste tendevano ad aprirsi. Per ovviare all’inconveniente, il cadavere veniva avvolto in bende tenute insieme da una colla, scura e densa. Ancora oggi non se ne conosce bene il composto, che qualcuno chiamò (in egiziano): mummif (bitume), da cui la parola mummia.